\hypertarget{_user_8h}{}\doxysection{D\+:/gitt/\+Microchip\+For32/bscpp\+\_\+\+System/\+User.h 文件参考}
\label{_user_8h}\index{D:/gitt/MicrochipFor32/bscpp\_System/User.h@{D:/gitt/MicrochipFor32/bscpp\_System/User.h}}


用户设置信息  


此图展示该文件直接或间接的被哪些文件引用了\+:
\nopagebreak
\begin{figure}[H]
\begin{center}
\leavevmode
\includegraphics[width=350pt]{_user_8h__dep__incl}
\end{center}
\end{figure}
\doxysubsection*{宏定义}
\begin{DoxyCompactItemize}
\item 
\#define \mbox{\hyperlink{_user_8h_a928bcd4ed1ca26fa864fe5516efa2b20}{\+\_\+\+\_\+\+DEBUG\+\_\+\+\_\+}}~0
\begin{DoxyCompactList}\small\item\em 调试模式开关 \end{DoxyCompactList}\end{DoxyCompactItemize}


\doxysubsection{详细描述}
用户设置信息 



在文件 \mbox{\hyperlink{_user_8h_source}{User.\+h}} 中定义.



\doxysubsection{宏定义说明}
\mbox{\Hypertarget{_user_8h_a928bcd4ed1ca26fa864fe5516efa2b20}\label{_user_8h_a928bcd4ed1ca26fa864fe5516efa2b20}} 
\index{User.h@{User.h}!\_\_DEBUG\_\_@{\_\_DEBUG\_\_}}
\index{\_\_DEBUG\_\_@{\_\_DEBUG\_\_}!User.h@{User.h}}
\doxysubsubsection{\texorpdfstring{\_\_DEBUG\_\_}{\_\_DEBUG\_\_}}
{\footnotesize\ttfamily \#define \+\_\+\+\_\+\+DEBUG\+\_\+\+\_\+~0}



调试模式开关 



在文件 \mbox{\hyperlink{_user_8h_source}{User.\+h}} 第 \mbox{\hyperlink{_user_8h_source_l00041}{41}} 行定义.

